Entries 12273 Mean 0.005348 RMS 89.45

m] μ [ y=0 xy| Δ track-to-track

-400 -300 -200 -100 0 100 200 300 400 events

0 100 200 300 400 500 600 700 Entries 12273

SPD+SSD